
diff -r 6787754b251b -r b6572d0336c3 doc/doxygen/latex/namespacenodemanager.tex
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/doc/doxygen/latex/namespacenodemanager.tex	Mon Jun 04 17:59:50 2007 +0200
@@ -0,0 +1,31 @@
+\hypertarget{namespacenodemanager}{
+\section{nodemanager Namespace Reference}
+\label{namespacenodemanager}\index{nodemanager@{nodemanager}}
+}
+
+
+\subsection*{Data Structures}
+\begin{CompactItemize}
+\item 
+class \hyperlink{classnodemanager_1_1UndoBuffer}{Undo\-Buffer}
+\item 
+class \hyperlink{classnodemanager_1_1NodeManager}{Node\-Manager}
+\end{CompactItemize}
+\subsection*{Functions}
+\begin{CompactItemize}
+\item 
+def \hyperlink{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}{Get\-New\-Id}
+\end{CompactItemize}
+
+
+\subsection{Function Documentation}
+\hypertarget{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}{
+\index{nodemanager@{nodemanager}!GetNewId@{GetNewId}}
+\index{GetNewId@{GetNewId}!nodemanager@{nodemanager}}
+\subsubsection[GetNewId]{\setlength{\rightskip}{0pt plus 5cm}def nodemanager::Get\-New\-Id ()}}
+\label{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}
+
+
+
+
+Definition at line 43 of file nodemanager.py.
\ No newline at end of file




