
diff -r 1df3055de547 -r 003cc3c63855 doc/doxygen/latex/namespacenodemanager.tex
--- a/doc/doxygen/latex/namespacenodemanager.tex	Thu Jun 07 09:03:41 2007 +0200
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,31 +0,0 @@
-\hypertarget{namespacenodemanager}{
-\section{nodemanager Namespace Reference}
-\label{namespacenodemanager}\index{nodemanager@{nodemanager}}
-}
-
-
-\subsection*{Data Structures}
-\begin{CompactItemize}
-\item 
-class \hyperlink{classnodemanager_1_1UndoBuffer}{Undo\-Buffer}
-\item 
-class \hyperlink{classnodemanager_1_1NodeManager}{Node\-Manager}
-\end{CompactItemize}
-\subsection*{Functions}
-\begin{CompactItemize}
-\item 
-def \hyperlink{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}{Get\-New\-Id}
-\end{CompactItemize}
-
-
-\subsection{Function Documentation}
-\hypertarget{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}{
-\index{nodemanager@{nodemanager}!GetNewId@{GetNewId}}
-\index{GetNewId@{GetNewId}!nodemanager@{nodemanager}}
-\subsubsection[GetNewId]{\setlength{\rightskip}{0pt plus 5cm}def nodemanager::Get\-New\-Id ()}}
-\label{namespacenodemanager_ea588f8d36eff932dcf6faf78a9ddf1d}
-
-
-
-
-Definition at line 43 of file nodemanager.py.
\ No newline at end of file




